
/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!50503 SET NAMES utf8mb4 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!50503 SET character_set_client = utf8mb4 */;
CREATE TABLE `www_form_settings` (
  `id` bigint unsigned NOT NULL AUTO_INCREMENT,
  `recipient_email` varchar(100) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '通知接收邮箱',
  `success_message_zh` varchar(300) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '感谢您的留言，我们会尽快回复！' COMMENT '提交成功提示（中文）',
  `success_message_en` varchar(300) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT 'Thank you for your message. We will get back to you soon!' COMMENT '提交成功提示（英文）',
  `error_message_zh` varchar(300) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '提交失败，请稍后重试。' COMMENT '提交失败提示（中文）',
  `error_message_en` varchar(300) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT 'Submission failed. Please try again later.' COMMENT '提交失败提示（英文）',
  `cooldown_seconds` int NOT NULL DEFAULT '60' COMMENT '防重复提交间隔（秒）',
  `updated_at` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='表单全局配置（单行）';
/*!40101 SET character_set_client = @saved_cs_client */;

/*!40000 ALTER TABLE `www_form_settings` DISABLE KEYS */;
INSERT INTO `www_form_settings` (`id`, `recipient_email`, `success_message_zh`, `success_message_en`, `error_message_zh`, `error_message_en`, `cooldown_seconds`, `updated_at`) VALUES (1,'','感谢您的留言，我们会尽快回复！','Thank you for your message!','提交失败，请稍后重试。','Submission failed.',60,'2026-08-03 08:59:30');
/*!40000 ALTER TABLE `www_form_settings` ENABLE KEYS */;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

