
/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!50503 SET NAMES utf8mb4 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!50503 SET character_set_client = utf8mb4 */;
CREATE TABLE `www_news_list_settings` (
  `id` bigint unsigned NOT NULL AUTO_INCREMENT,
  `hero_title_zh` varchar(100) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '新闻中心' COMMENT 'Page Hero 标题（中文）',
  `hero_title_en` varchar(100) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT 'News' COMMENT 'Page Hero 标题（英文）',
  `hero_subtitle_zh` varchar(200) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '获取乐笙最新资讯与行业动态' COMMENT '副标题（中文）',
  `hero_subtitle_en` varchar(200) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT 'Get the latest Luxsin news and industry insights' COMMENT '副标题（英文）',
  `hero_bg_url` varchar(500) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT 'Page Hero 背景图',
  `page_size` int NOT NULL DEFAULT '9' COMMENT '每页显示数量',
  `pagination_mode` varchar(20) COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT 'paginator' COMMENT '分页方式: paginator / load_more',
  `updated_at` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='新闻列表页配置（单行）';
/*!40101 SET character_set_client = @saved_cs_client */;

/*!40000 ALTER TABLE `www_news_list_settings` DISABLE KEYS */;
INSERT INTO `www_news_list_settings` (`id`, `hero_title_zh`, `hero_title_en`, `hero_subtitle_zh`, `hero_subtitle_en`, `hero_bg_url`, `page_size`, `pagination_mode`, `updated_at`) VALUES (1,'新闻中心','News','获取乐笙最新资讯与行业动态','Get the latest Luxsin news and industry insights','/uploads/2026/08/1786355142479-7up2o7.jpg',9,'paginator','2026-08-10 09:46:18');
/*!40000 ALTER TABLE `www_news_list_settings` ENABLE KEYS */;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

